-- initial configuration for PhpWebGallery

INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_language','en_UK.iso-8859-1','Default gallery language');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_template','yoga/clear','Default gallery style');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_maxwidth','','maximum width authorized for displaying images');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('default_maxheight','','maximum height authorized for the displaying images');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_comment_page','10','number of comments to display on each page');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('log','false','keep an history of visits on your website');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('comments_validation','false','administrators validate users comments before becoming visible');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('comments_forall','false','even guest not registered can post comments');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_image_line','5','Number of images displayed per row');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nb_line_page','3','Number of rows displayed per page');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('recent_period','7','Period within which pictures are displayed as new (in days)');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('auto_expand','false','Auto expand of the category tree');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('show_nb_comments','false','Show the number of comments under the thumbnails');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('gallery_locked','false','Lock your gallery temporary for non admin users');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('gallery_title','PhpWebGallery demonstration site','Title at top of each page and for RSS feed');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('gallery_url','http://demo.phpwebgallery.net','URL given in RSS feed');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('rate','true','Rating pictures feature is enabled');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('rate_anonymous','true','Rating pictures feature is also enabled for visitors');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('page_banner','<h1>PhpWebGallery demonstration site</h1><p>My photos web site</p>','html displayed on the top each page of your gallery');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('history_admin','false','keep a history of administrator visits on your website');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('history_guest','true','keep a history of guest visits on your website');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('login_history','true','keep a history of user logins on your website');
-- Notification by mail
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nbm_send_mail_as','','Send mail as param value for notification by mail');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nbm_send_detailed_content','true','Send detailed content for notification by mail');
INSERT INTO phpwebgallery_config (param,value,comment) VALUES ('nbm_complementary_mail_content','','Complementary mail content for notification by mail');
